/*
 *      Terminal definition file for UMIST site.
 *      All terminals supported.
 */

#include "UMISTchars.def"

/* the UMIST PADs demand <cntl-s> <cntl-q> handshaking */
#define T_STARTC 021
#define T_STOPC 023

#include "vt100.def"
#include "cf2605.def"
#include "cf2634.def"
#include "cfT2.def"
#include "hp300.def"
